van Tartwijk and San Miguel: \Optical Feedback on Self-Pulsating ... 12

Figure 12: The effect of the feedback phase on the the time between two consecutive pulses, in the case of a pump current of 117.5 mA, a feedback rate of γ = 5 (ns)�^1, and a delay time of τ = 0.21 ns. Feedback is switched on at n = 75 while noise is switched on at n = 389 (dotted line).