van Tartwijk and San Miguel: \Optical Feedback on Self-Pulsating ... 8

Figure 8: The effect of the feedback time on the pulse period (top) and the jitter (bottom) at pump current of 80 mA, feedback rate γ = 10 ns�^1, and feedback phase ω_0τ = 3π/2. The free running laser has an average pulse period < T >= 0.387 ns with jitter 12 ps.